16:28:50.0

16:28:10.0

27:30.0

40:00.0

35:00.0

15:30:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00382399000 / DATE-OBS 2010-01-11T04:27:12.0

UVOT Finding Chart