4:41:06.0

4:41:00.0

4:40:54.0

33:00.0

30.0

44:32:00.0

31:00.0

30:30.0

RA (J2000)

Dec (J2000)

OBSID 00418178000 / DATE-OBS 2010-04-03T20:38:24.9

UVOT Finding Chart