58.0

54.0

17:44:50.0

30.0

51:00.0

15:50:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00419404000 / DATE-OBS 2010-04-13T17:47:57.4

UVOT Finding Chart