18:42:30.0

26.0

22.0

21:00.0

30.0

18:20:00.0

19:00.0

18:30.0

RA (J2000)

Dec (J2000)

OBSID 00421695000 / DATE-OBS 2010-05-11T11:51:59.8

UVOT Finding Chart