024681012141618202221:01:20.0

10.0

04:30.0

05:00.0

30.0

-51:06:00.0

07:00.0

08:00.0

RA (J2000)

Dec (J2000)

OBSID 00425151000 / DATE-OBS 2010-06-21T03:05:03.4

UVOT Finding Chart