010203040506038.0

34.0

8:54:30.0

11:00.0

30.0

-24:12:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 00426722000 / DATE-OBS 2010-07-04T03:49:37.1

UVOT Finding Chart