0510152025303540455011:06:00.0

56.0

52.0

05:48.0

39:00.0

30.0

-26:40:00.0

41:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 00429954000 / DATE-OBS 2010-07-25T07:27:31.6

UVOT Finding Chart