01020304050607020.0

19:20:00.0

19:40.0

30.0

58:00.0

76:57:00.0

56:00.0

RA (J2000)

Dec (J2000)

OBSID 00429969000 / DATE-OBS 2010-07-25T11:39:18.1

UVOT Finding Chart