0510152025303536.0

19:59:30.0

24.0

30.0

38:00.0

52:37:00.0

36:00.0

35:30.0

RA (J2000)

Dec (J2000)

OBSID 00430957000 / DATE-OBS 2010-08-05T04:14:58.2

UVOT Finding Chart