0102030405024.0

3:46:20.0

16.0

40:30.0

41:00.0

30.0

-3:42:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00430975000 / DATE-OBS 2010-08-05T07:57:24.3

UVOT Finding Chart