024681012141618202254.0

1:22:50.0

46.0

30.0

51:00.0

5:50:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00432420000 / DATE-OBS 2010-08-23T17:26:59.3

UVOT Finding Chart