010203040506070809010012:26:45.0

12:26:35.0

45:00.0

30.0

-62:46:00.0

47:00.0

RA (J2000)

Dec (J2000)

OBSID 00432983000 / DATE-OBS 2010-08-30T23:36:37.7

UVOT Finding Chart