0510152004.0

1:49:00.0

48:56.0

46:00.0

30.0

22:45:00.0

44:00.0

43:30.0

RA (J2000)

Dec (J2000)

OBSID 00433065000 / DATE-OBS 2010-09-01T13:39:21.8

UVOT Finding Chart