05101520253035404538.0

34.0

3:14:30.0

26.0

30.0

56:00.0

30:55:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 00433160000 / DATE-OBS 2010-09-02T19:46:18.3

UVOT Finding Chart