0246810121452.0

46.0

1:54:40.0

34.0

30.0

39:00.0

55:38:00.0

37:00.0

36:30.0

RA (J2000)

Dec (J2000)

OBSID 00433509000 / DATE-OBS 2010-09-06T14:03:47.3

UVOT Finding Chart