024681012141620.0

10.0

3:13:00.0

-65:58:00.0

30.0

59:00.0

-66:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00436094000 / DATE-OBS 2010-10-11T17:00:06.3

UVOT Finding Chart