0246810121421:12:00.0

50.0

11:40.0

22:00.0

30.0

-65:23:00.0

24:00.0

RA (J2000)

Dec (J2000)

OBSID 00436981000 / DATE-OBS 2010-10-23T22:51:51.6

UVOT Finding Chart