01234567815.0

4:26:00.0

45.0

25:30.0

13:30.0

14:00.0

30.0

-77:15:00.0

16:00.0

RA (J2000)

Dec (J2000)

OBSID 00437016000 / DATE-OBS 2010-10-24T11:44:29.9

UVOT Finding Chart