0123456780:49:00.0

56.0

48:52.0

33:00.0

30.0

-34:34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00440635000 / DATE-OBS 2010-12-19T16:33:14.7

UVOT Finding Chart