0102030405060708052.0

46.0

19:03:40.0

34.0

30.0

44:00.0

45:43:00.0

42:00.0

41:30.0

RA (J2000)

Dec (J2000)

OBSID 00440955000 / DATE-OBS 2010-12-24T05:28:43.1

UVOT Finding Chart