0102030405020.0

10.0

5:17:00.0

12:00.0

30.0

11:00.0

64:10:00.0

09:30.0

RA (J2000)

Dec (J2000)

OBSID 00441664000 / DATE-OBS 2011-01-06T16:24:12.5

UVOT Finding Chart