5101520253035404523.0

23:14:20.0

17.0

6:00:00.0

30.0

59:00.0

5:58:00.0

RA (J2000)

Dec (J2000)

OBSID 00442978000 / DATE-OBS 2011-01-19T22:22:12.0

UVOT Finding Chart