051015202530354038.0

34.0

12:55:30.0

26.0

22.0

30.0

06:00.0

28:05:00.0

04:00.0

03:00.0

RA (J2000)

Dec (J2000)

OBSID 00443861000 / DATE-OBS 2011-01-28T01:58:59.0

UVOT Finding Chart