0123456789:12:00.0

9:09:00.0

9:06:00.0

38:00.0

30.0

88:37:00.0

36:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00444230000 / DATE-OBS 2011-02-01T09:37:22.4

UVOT Finding Chart