2500

3000

3500

4000

4500

20.0

1:30:00.0

40.0

29:20.0

28:00.0

30:00.0

32:00.0

34:00.0

36:00.0

38:00.0

-20:40:00.0

42:00.0

44:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00445038000 / DATE-OBS 2011-02-08T21:12:17.8

UVOT Finding Chart