0246810121416182:52:00.0

56.0

52.0

48.0

51:44.0

30.0

17:00.0

49:16:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00445414000 / DATE-OBS 2011-02-13T05:22:48.6

UVOT Finding Chart