024681012141605:00.0

23:03:00.0

01:00.0

35:00.0

30.0

87:34:00.0

33:00.0

32:00.0

RA (J2000)

Dec (J2000)

OBSID 00446674000 / DATE-OBS 2011-02-23T20:58:43.0

UVOT Finding Chart