02468101215.0

10:01:00.0

18:30.0

19:00.0

30.0

-68:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00446677000 / DATE-OBS 2011-02-23T21:30:44.9

UVOT Finding Chart