024681012141616:45:00.0

54.0

48.0

44:42.0

30.0

36:00.0

57:35:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00450158000 / DATE-OBS 2011-03-28T13:22:35.0

UVOT Finding Chart