02468101214161850.0

13:09:40.0

30.0

16:00.0

61:15:00.0

14:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 00450545000 / DATE-OBS 2011-04-02T00:22:11.8

UVOT Finding Chart