05101520253048.0

44.0

0:08:40.0

36.0

32.0

51:30.0

52:00.0

30.0

-37:53:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 00451757000 / DATE-OBS 2011-04-20T11:04:08.3

UVOT Finding Chart