010203040506036.0

8:00:30.0

24.0

51:00.0

30.0

45:50:00.0

49:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00453788000 / DATE-OBS 2011-05-21T15:53:23.4

UVOT Finding Chart