0510152020.0

10.0

18:48:00.0

30.0

57:00.0

61:56:00.0

55:00.0

54:30.0

RA (J2000)

Dec (J2000)

OBSID 00454473000 / DATE-OBS 2011-05-30T15:38:27.2

UVOT Finding Chart