02468101218:41:20.0

16.0

12.0

54:30.0

55:00.0

30.0

-4:56:00.0

57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00455904000 / DATE-OBS 2011-06-23T14:46:51.8

UVOT Finding Chart