051015202530354008.0

04.0

18:50:00.0

54:30.0

55:00.0

30.0

-0:56:00.0

57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00456014000 / DATE-OBS 2011-06-25T00:20:39.5

UVOT Finding Chart