05101520253035404530.0

1:46:20.0

10.0

30.0

46:00.0

61:45:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00458345000 / DATE-OBS 2011-07-29T11:33:42.3

UVOT Finding Chart