0102030405060708008.0

04.0

18:42:00.0

41:56.0

31:00.0

30.0

-28:32:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 00458448000 / DATE-OBS 2011-07-31T11:24:02.7

UVOT Finding Chart