02040608010020.0

5:58:00.0

40.0

57:20.0

59:00.0

30.0

80:58:00.0

57:00.0

56:00.0

RA (J2000)

Dec (J2000)

OBSID 00458521000 / DATE-OBS 2011-08-01T20:04:20.0

UVOT Finding Chart