051015202512.0

06.0

3:49:00.0

-44:10:00.0

30.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00458918000 / DATE-OBS 2011-08-08T06:21:01.8

UVOT Finding Chart