01234540.0

21:09:30.0

20.0

56:30.0

-63:57:00.0

30.0

58:00.0

59:00.0

-64:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00500914000 / DATE-OBS 2011-08-18T20:52:12.6

UVOT Finding Chart