0123456740.0

30.0

20.0

10.0

22:53:00.0

70:20:00.0

19:00.0

18:00.0

17:00.0

16:30.0

RA (J2000)

Dec (J2000)

OBSID 00501095000 / DATE-OBS 2011-08-20T17:40:54.3

UVOT Finding Chart