051015202530354058.0

54.0

18:34:50.0

46.0

43:30.0

44:00.0

30.0

-8:45:00.0

46:00.0

47:00.0

RA (J2000)

Dec (J2000)

OBSID 00501752000 / DATE-OBS 2011-08-30T00:28:57.2

UVOT Finding Chart