010203040506028.0

24.0

19:58:20.0

16.0

30.0

13:00.0

35:12:00.0

11:00.0

10:30.0

RA (J2000)

Dec (J2000)

OBSID 00502297000 / DATE-OBS 2011-09-04T04:33:34.2

UVOT Finding Chart