02040608010012017:12:40.0

34.0

28.0

37:00.0

30.0

38:00.0

39:00.0

-37:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00504101000 / DATE-OBS 2011-09-26T20:13:42.5

UVOT Finding Chart