0510152025303506.0

17:11:00.0

10:54.0

30.0

35:00.0

36:34:00.0

33:00.0

32:30.0

RA (J2000)

Dec (J2000)

OBSID 00504215000 / DATE-OBS 2011-09-28T02:47:21.2

UVOT Finding Chart