0510152025303558.0

54.0

17:40:50.0

46.0

04:00.0

30.0

-28:05:00.0

06:00.0

07:00.0

RA (J2000)

Dec (J2000)

OBSID 00505516000 / DATE-OBS 2011-10-15T01:17:42.8

UVOT Finding Chart