0510152018:06:00.0

56.0

05:52.0

53:00.0

30.0

-3:54:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00505801000 / DATE-OBS 2011-10-18T17:40:53.7

UVOT Finding Chart