0102030405060708012.0

08.0

04.0

19:08:00.0

57:30.0

-37:58:00.0

30.0

59:00.0

-38:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00505926000 / DATE-OBS 2011-10-20T06:35:16.3

UVOT Finding Chart