05101520253035407:16:00.0

55.0

15:50.0

45.0

30.0

42:00.0

41:00.0

49:40:00.0

39:30.0

RA (J2000)

Dec (J2000)

OBSID 00506074000 / DATE-OBS 2011-10-22T17:15:36.7

UVOT Finding Chart