051015202517:42:50.0

46.0

42.0

30.0

37:00.0

1:36:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00506903000 / DATE-OBS 2011-11-03T11:00:19.8

UVOT Finding Chart